{"text_format":"dbase-jsonl-2026-09-30","columns":[{"name":"LAYER","type":"character","width":73},{"name":"GM_TYPE","type":"character","width":17},{"name":"ELEVATION","type":"number","width":1,"decimals":0},{"name":"DGN_LEVEL","type":"number","width":2,"decimals":0}],"n_rows":1,"rows_kept":1,"cut":false,"deleted_skipped":0,"read_ended":"whole","bounds":"16MiB/16384/4096/first_that_fit","version":"dbase_level_three","encoding_class":"enc_absent","reader":"statdb_count/12"}
["\u0001\\U+4F42\\U+4452\\U+5245\u009b\\U+3031\u0089\\U+656D\\U+6574\\U+2072\\U+7562\\U+6666\\U+7265","Unknown Area Type",0,20]